-- scheduled_tasks.user_id 默认值修复
ALTER TABLE scheduled_tasks ALTER COLUMN user_id SET DEFAULT '';
ALTER TABLE scheduled_tasks ALTER COLUMN user_id DROP NOT NULL;
